Header line text (29 char)... NetCd  (5 chars),   This line comment for next  
Mars88 data from test         NEWNT
 chan stati  comi stato  como, In and output def. This line comment for next
      00174  S  Z STA    B  Z
      00174  S  N STA    B  N  
      00174  S  E STA    B  E 

