Chile

80˚W 75˚W 70˚W 65˚W 60˚W 55˚W 50˚W

Add some text

----------

Shallow depth (0-100 km) Intermediate depth (100-300 km) Very deep (> 300 km) M 3 M 4 M 5 M 6 M 7 M 8 M 9