Norway

0˚ 5˚E 10˚E 15˚E 20˚E 25˚E 30˚E

Fault line

----------------------------------------

Shallow depth (0-100 km) Intermediate depth (100-300 km) Very deep (> 300 km) M 3 M 4 M 5 M 6 M 7 M 8 M 9