Dominican Republic

-75˚ -74˚ -73˚ -72˚ -71˚ -70˚ -69˚ -68˚ -67˚ -66˚

LOBA1

LONE1

LOPE1

AGPR BANI MPR SDD SDDR

NADR

PPDR

BON1

SC01

SJM1 LGNH HIGY1